Premium Diamond Wheel – 2mm w/Radius (Finish)

Diamond Wheel 8″ OD x 5 mm thick x 60 mm bore, Finish 2mm thick with 1mm radius Type 14F1R Diamond abrasive, thanks to its hardness, is suitable for machining all carbides For finish grinding of tungsten carbide profile knives   Equivalent to Weinig # 930062011

The post Premium Diamond Wheel – 2mm w/Radius (Finish) appeared first on Masse Sales Ltd..