Weinig Grinding Wheel Ceramic Cubitron 225 x 5 x 60mm bore 54 Grit

Specifications: Diameter: 225mm Thickness: 5mm Bore: 60mm Composition: Ceramic Cubitron Color: Blue 54 grit ceramic grinding wheel for rough grinding Best performance achieved when used on harder steels such as M3+ and SUPRE, and deep profiles

The post Weinig Grinding Wheel Ceramic Cubitron 225 x 5 x 60mm bore 54 Grit appeared first on Masse Sales Ltd..