Tyrolit Grinding Wheel 89A White 225 x 5 x 31.75mm bore

Specifications: Diameter: 225mm Thickness: 5mm Bore: 31.75mm Composition: 89A Color: White

The post Tyrolit Grinding Wheel 89A White 225 x 5 x 31.75mm bore appeared first on Masse Sales Ltd..