Tyrolit Grinding Wheel 89A White 225 x 5 x 60mm bore

Specifications: Diameter: 225mm Thickness: 5mm Bore: 60mm Composition: 89A Color: White

The post Tyrolit Grinding Wheel 89A White 225 x 5 x 60mm bore appeared first on Masse Sales Ltd..