Standard Import CDX Diamond Wheel – 4mm w/Radius (Rough)

CDX Diamond Grinding Wheel 8? OD x 5 mm thick x 60 mm bore 4mm thick with 2mm radius For simultaneous rough grinding of both steel and carbide on TCT inlaid profile knives Diamond abrasive, thanks to its hardness, is suitable for machining all carbides Weinig equivalent # 930062020

The post Standard Import CDX Diamond Wheel – 4mm w/Radius (Rough) appeared first on Masse Sales Ltd..