Borozon Grinding Wheel HSS Finish 180 Grit 8″ x 5 mm x 60 mm bore

CBN Wheel 8″ OD x 5 mm thick x 60 mm bore, 180 Grit 4mm thick with 2mm radius Borazon Wheel Type 14F1R Borazon should be used with HSS/stellite steel, retains true shape and profile, no dressing necessary. for finish grinding of HSS straight and profile knives Weinig # 930062007

The post Borozon Grinding Wheel HSS Finish 180 Grit 8″ x 5 mm x 60 mm bore appeared first on Masse Sales Ltd..