Weinig Grinding Wheel Premium Blue 225 x 5 x 60mm bore

Specifications: Diameter: 225mm Thickness: 5mm Bore: 60mm Composition: Premium Color: Blue Best performance achieved when used on SRS, M2, and shallow profiles of M3+

The post Weinig Grinding Wheel Premium Blue 225 x 5 x 60mm bore appeared first on Masse Sales Ltd..